TYPE = "string";             Output prompt for operator

The TYPE instruction causes the specified string to be output to
the standard output device (normally the screen).  Use this
instruction to prompt the operator.

These prompts will overwrite any existing graph unless you have a
Hercules interface.  Use TYPE only before the first plot has been
generated, or after an ERASE.
